10^{-1} 10^0 10^1 0 0.2 0.4 0.6 0.8 1

f

BATSE

10^{-1} 10^0 10^1 0 0.2 0.4 0.6 0.8 1

f

Swift

10^0 10^1 0 0.2 0.4 0.6 0.8 1

T_{90} [s] f

Fermi

90% confidence 67% confidence