SDAST meeting # 23 June 4th 2002

V1 Status

j prp status table • Version 2.3 delivered 16/4/02 • No outstanding SPRs • Raised SCREW-605: needs to handle RATE data

j prp verify • Version 1.1 delivered 7/5/02 • Raised SCREW 604: lacks complete functionality • Raised SPR 1407: string overflow

j calib gain fitting • Version 5.1 delivered 10/1/02 • Raised∗ SPR 1418: doesn’t update index • Accepted∗ SPR 1060: some error messages should be warnings • Accepted SCREW 528: needs to handle Fe-55 sources

j calib adc Version 1.3 delivered 29/5/02 No outstanding SPRs or SCREWs Problem found with ECAL parser

Carol Anne Oxborrow

SDAST meeting # 23 June 4th 2002

Individual components

j cor gain Version 2.2 delivered 3/5/02 Accepted SCREW 551: more flexible time-variation model Accepted SPR 1355: doesn’t close IMOD-GRP

j cor position Version 3.0 delivered 3/5/02 No outstanding SPRs or SCREWs

j dead time calc • Version 2.0 delivered 6/5/02 • No outstanding SCREWs • Accepted SPR 1371: calls to RIL before CommonInit

Carol Anne Oxborrow

SDAST meeting # 23 June 4th 2002 Documentation: UM and ADD • REMEMBER TO UPDATE ADD ENTRIES WITH EACH DELIVERY • ADD 7.1 planned for end of June (after V2 freeze) • ADD 7.0 change document can be seen on forum • UM has been updated with ADD 7.0 files • Masha needs extended descriptions for the UM - by June 7th!

Carol Anne Oxborrow